Average autopick FOM for all micrographs

1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 1.8

1.9

2.0

2.1

2.2

2.3

2.4

2.5

2.6

rlnAutopickFigureOfMerit